\begin{align*}
  \rhohat_M - \rhohat_I &= 0.0038  & \frac{\rhohat_M - \rhohat_I}{s_d/\sqrt{n}} &= \frac{0.0038}{0.0075} = 0.5095.
\end{align*}
